ped_p_mean

Entries 13 Mean 1.001e+04 RMS 24.27

Mean Pedestal, ped runs

187mm ° 0.60 9950

9956

9962

9969

9975

9981

9988

9994

10000

10006

10012

10019

10025

10031

10038

10044

10050

Mean Pedestal, ped runs_{int_p_mean}

Entries 206 Mean 9996 RMS 35.39

Mean Pedestal interleaved

187mm ° 0.60 9075

9136

9197

9258

9319

9379

9440

9501

9562

9623

9684

9745

9806

9867

9928

9989

10050

warning: at least one cluster with 7 pixels found where values < (10000 - 20) npe_mean

Entries 1039 Mean 74.65 RMS 4.907

Number of photoelectrons Interleaved

187mm ° 0.60 30 37 44 51 58 64 71 78 85 92 99 106 112 119 126 133 140

ped_p_rms

Entries 13 Mean 2.461 RMS 1.782

Pedestal RMS ped runs

187mm ° 0.60 0.0 0.3 0.6 0.9 1.2 1.6 1.9 2.2 2.5 2.8 3.1 3.4 3.8 4.1 4.4 4.7 5.0

Pedestal RMS ped runs_{int_p_rms}

Entries 206 Mean 3.953 RMS 1.682

Pedestal RMS interleaved

187mm ° 0.60 0.0 0.3 0.6 0.9 1.2 1.6 1.9 2.2 2.5 2.8 3.1 3.4 3.8 4.1 4.4 4.7 5.0

cf_men

Entries 1039 Mean 0.01091 RMS 0.0006921

C factor Interleaved

187mm ° 0.60 0.0050

0.0056

0.0062

0.0069

0.0075

0.0081

0.0088

0.0094

0.0100

0.0106

0.0112

0.0119

0.0125

0.0131

0.0137

0.0144

0.0150